)c (GeV/ Tp 0.4 1 2 3 4 5 6 78 10 20 30 40

recε⋅A⋅yΔ⋅π = 2 ε

3−10

2−10

1−10

1

PCM PCM-EMC EMC

ALICE simulation

= 8 TeV s pp, γγ→η